LIFO 25 LIFO 50 LIFO 100 FIFO 25 FIFO 50 FIFO 100

| 1 | | | | | | | | | 10 | | | | | | | | | 100 | | | | | | | | |

1000

| | | | | | | | |

10000

|

1

| | | | | | | ||

10

|

| | | | | ||||| | | | | ||||| | | | | ||||| | | | | |||||

| | | | | | | | | | |

Window Size: t

(b) MMP

Code Block Working Set Function: W_B(t)