LIFO 50 LIFO 200 LIFO 800 FIFO 50 FIFO 200 FIFO 800

| 1 | | | | | | | | | 10 | | | | | | | | | 100 | | | | | | | | |

1000

| | | | | | | | |

10000

|

1

| | | | | | | ||

10

| | | | | | | ||

100

| | | | |||||| | | | |||||| | | | |||||| | | | ||||||

| | | | | | | | | | | | | | | | | | |

Window Size: t

(a) Gamteb

Thread Working Set Function: W_t(t)