% Sample LCS/CSG Memo Cover Sheet

\documentstyle[12pt]{article}

% HORIZONTAL MARGINS
% Left margin 1 inch (0 + 1)
\setlength{\oddsidemargin}{0in}
% Text width 6.5 inch (so right margin 1 inch).
\setlength{\textwidth}{6.5in}

% VERTICAL MARGINS
% Top margin 0.8 inch (-0.2 + 1)
\setlength{\topmargin}{-0.2in}
% Head height 0.25 inch (where page headers go)
\setlength{\headheight}{0.25in}
% Head separation 0.25 inch (between header and top line of text)
\setlength{\headsep}{0.25in}
% Text height 9 inch (so bottom margin 1 in)
\setlength{\textheight}{9in}

% Paragraph Indentation
\setlength{\parindent}{0in}
% Space between paragraphs
\setlength{\parskip}{\medskipamount}

\pagestyle{empty}

% short forms for italicized ``i.e.'', ``e.g.'', ``etc.''
\newcommand{\ie}{{\em i.e.,\/}}
\newcommand{\eg}{{\em e.g.,\/}}
\newcommand{\etc}{{\em etc.\/}}

% This command should specify a directory for ps files for illustrations.
\def\psfileprefix{/home/www/csg-memos/covers/}
\def\illustration#1#2{
\vbox to #2{\vfill\special{psfile=\psfileprefix#1.ps hoffset=-72 voffset=-45}}} 

% THE DOCUMENT ************************************************

\begin{document}

\rule{0in}{0.85in}

\begin{center}

% *** TITLE ***
\rule[-1.3in]{0in}{1.5in}\parbox[t]{6in}{\centering
\Large\bf
Properties of a First-order Functional Lanuage with Sharing}

% *** CSG MEMO NUMBER, DATE ***
\rule[-1.1in]{0in}{1.3in}\parbox[t]{6in}{\centering
Computation Structures Group Memo 347-1\\
1 June 1994\\
Supercedes CSG Memo 347
}

%\rule[-1.1in]{0in}{1.3in}\parbox[t]{6in}{\centering
%\LARGE\bf **** DRAFT ****
%}


% *** AUTHOR(S) ***
\rule[-2.7in]{0in}{2.9in}\parbox[t]{6in}{\centering
{\bf Zena M. Ariola} \\

{\em University of Oregon }

\vspace{0.5in}

{\bf Arvind}

{\em MIT}

%{\centering \Large\bf **** DRAFT ****}

%\parbox{5in}{\footnotesize
%Submitted to the Journal of Symbolic Computation.
%
%}
}

% *** RESEARCH SUPPORT ACK ***
\rule[-0.7in]{0in}{1in}\parbox[t]{6in}{\centering
\parbox{5in}{\footnotesize
Funding for this work has been provided in part by the
Advanced Research Projects Agency of the Department of Defense
under the Office of Naval Research contract N00014-92-J-1310 (MIT)
and by the University of Oregon.}
}

\end{center}

\vfill

% This is the oval border, mens et manus logo, etc. Don't touch it. It refers to the
% postscript file ``lcscover.ps''

\begin{figure}[htbp]
\illustration{lcscover}{0 true in}
\end{figure}

\end{document}
