idles token counts

|

|

0

|

4000

|

8000

|

12000

|

16000

|

20000

|

24000

|

28000

|

32000

|

36000

Different sequential loop schema x1000 cycles Culler’s Self-Gating Gated-Store-FBV 2-slot-FBV