\documentstyle[12pt]{article}

\setlength{\topmargin}{-0.60in}
\setlength{\textwidth}{6.5in}
\setlength{\oddsidemargin}{0.0in}
\setlength{\textheight}{9.3in}
\input{macros}
\def\figurefileprefix{./}

\def\floatpagefraction{.75}


\hyphenation{data-flow}
\begin{document}
\input{title}
\input{introduction}
\input{model}
\input{scheduler}
\input{ray-tracer}
\input{pfold}
\input{conclusion}
\bibliographystyle{plain}
\bibliography{pcm}
\end{document}
