% -*- Mode: LaTeX -*-

\begin{abstract}

The semantics of kernel pH are defined in the form of a parallel,
normalizing interpreter. A description of I-structure and M-structure
operators is also given within the same framework. Semantics of
barriers in pH are presented by translation into the kernel language
without barriers. The framework presented is also suitable for
multithreaded compilation of pH.

\end{abstract}

