\documentstyle[times,twocolumn,latex8]{article}

\input support/acaro-figure-macro.tex
\input support/6851macro
\input support/macros

%\pagestyle{empty}
\begin{document}

%don't want date printed
\date{}

%make title bold and 14 pt font (Latex default is non-bold, 16 pt)
\title{\Large\bf Performance Tuning Scientific Codes for Dataflow
Execution}

\author{
Andrew Shaw, Arvind, R. Paul Johnson\\
MIT Laboratory for Computer Science\\
545 Technology Square\\
Cambridge, MA 02139\\
{\tt \symbol{'173}shaw\symbol{'174}arvind\symbol{'174}rpaul\symbol{'175}@lcs.mit.edu}
}
 

\maketitle

%I don't know why I have to reset thispagesyle, but otherwise get page numbers
\thispagestyle{empty}

\input abstract

\input introduction
\input performance
\input pcg
\input comparison
\input conclusion
\input acknowledgements

\bibliographystyle{latex8}
\bibliography{abbrevs,pact96}

\end{document}
