\documentstyle[oneinchmargins,multicol,palatino,lcscover]{article}

%I copied stuff out of art10.sty and modified them to conform to IEEE format

\makeatletter
%as Latex considers descenders in its calculation of interline spacing,
%to get 12 point spacing for normalsize text, must set it to 10 points
\def\@normalsize{\@setsize\normalsize{12pt}\xpt\@xpt
\abovedisplayskip 10pt plus2pt minus5pt\belowdisplayskip \abovedisplayskip
\abovedisplayshortskip \z@ plus3pt\belowdisplayshortskip 6pt plus3pt
minus3pt\let\@listi\@listI} 

%need an 11 pt font size for subsection and abstract headings
\def\subsize{\@setsize\subsize{12pt}\xipt\@xipt}

%make section titles bold and 12 point, 2 blank lines before, 1 after
\def\section{\@startsection {section}{1}{\z@}{24pt plus 2pt minus 2pt}
{12pt plus 2pt minus 2pt}{\large\bf}}

%make subsection titles bold and 11 point, 1 blank line before, 1 after
\def\subsection{\@startsection {subsection}{2}{\z@}{12pt plus 2pt minus 2pt}
{11pt plus 2pt minus 2pt}{\subsize\bf}}
\makeatother

\begin{document}

\input cover

\title{}
\date{}
\author{}
\maketitle

%\small
%\bibliographystyle{ieeetr}
%\bibliography{abbrevs,science}

\end{document}
