0 1000 2000 3000 4000

Theoretical Peak Floating Point Performance (64-bit MFlop/s) 0

500

1000

1500

2000

Main Memory Bandwidth (64-bit MWord/s)

Cray T94 1 proc/1995

Cray C90 1 proc/1993

Cray Y-MP 1 proc/1989

CM-5 32 proc/1992

DEC 8400 4 proc/1995 circa 1989 workstations